<span style="font-family: arial, helvetica, sans-serif;">[Comment]</span>

<hr />

<span style="font-family: arial, helvetica, sans-serif;">Comparison Sites;</span>
<ul>
 	<li>https://sunrisederm.com/: So many pictures of their building, are they selling the architecture or dermatology?</li>
 	<li>https://www.sunrisedermatology.com/: Cruddy implementation, pictures of people are cutoff, the horizontal scroll bar is annoying, and there's that lazy hidden text behind the main picture (amateur  implementation)</li>
</ul>

<hr />

<span style="font-family: arial, helvetica, sans-serif;">Colors;</span>

<span style="font-family: arial, helvetica, sans-serif;">Light Green: #12BB18
Dark Green: #229842
</span>

<img class="alignnone size-medium wp-image-86" src="https://hornbeckmd.com/wp-content/uploads/2021/03/IMG_0681-2-225x300.jpg" alt="" width="225" height="300" />

Fountain Fill: Olive Green: #5E7F52, Gray / Green: #6A83366

<img class="alignnone size-medium wp-image-87" src="https://hornbeckmd.com/wp-content/uploads/2021/03/IMG_0698-139x300.jpg" alt="" width="139" height="300" />

<span style="font-family: arial, helvetica, sans-serif;">[/Comment]</span>